Summary Page Created:Fri September 22, 2006 21:28 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 2754 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

acisf02754N003 full img2.fits acisf02754N003 cntr img2.fits

Summary Page Created:Fri September 22, 2006 21:28 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 2754 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-23T00:57:42 Date and time of file creation DATE-OBS 2002-07-16T03:13:43 Observation start date DATE-END 2002-07-16T12:00:41 Observation end date RA PNT 165.68083108376 Pointing RA DEC PNT -60.9096580622 Pointing Dec ROLL PNT 222.00187790097 Pointing Roll RA TARG 165.738333 Observer’s specified target RA DEC TARG -60.909444 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-23T01:27:03 Date and time of file creation DATE-OBS 2002-07-16T03:13:43 Observation start date DATE-END 2002-07-16T12:00:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT MSH 11-61A Source name TITLE AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11- 61A AND ITS NEUTRON STAR CANDIDATE RX J1102.9-6054

Proposal title

OBSERVER Dr. Peter Predehl Principal investigator OBS ID 2754 Observation id SEQ NUM 500204 Sequence number RA NOM 165.68083108376 Nominal RA DEC NOM -60.9096580622 Nominal Dec ROLL NOM 222.00187790097 Nominal Roll

Summary Page Created:Fri September 22, 2006 21:28 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 2754 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 165.828001 -60.920686 470.000000 23.931120 19.639700 165.493681 -60.947352 203.352280 16.535494 12.297925 165.860580 -60.909791 85.625000 11.608666 7.375955 165.770546 -60.893118 78.571426 11.151512 7.045809 165.465594 -60.865985 72.872498 11.362265 6.413554 165.534680 -60.809593 89.738640 14.522118 6.179446 165.896134 -61.178292 138.916672 24.948151 5.568215 165.621221 -60.815860 60.750000 11.359451 5.347970 165.679309 -60.827749 48.750000 9.259086 5.265099 165.636233 -60.993440 40.958332 7.917162 5.173360