Summary Page Created:Sat September 2, 2006 16:30 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500206

Instrument: HRC Obs ID: 2756 Source: 3C58 PI: Dr. Stephen Murray Title: MEASUREMENT OF P-DOT IN 3C58

hrcf02756N002 full img2.fits hrcf02756N002 cntr img2.fits

Summary Page Created:Sat September 2, 2006 16:30 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500206

Instrument: HRC Obs ID: 2756 Source: 3C58 PI: Dr. Stephen Murray Title: MEASUREMENT OF P-DOT IN 3C58

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T18:23:44 Date and time of file creation DATE-OBS 2002-02-27T07:41:01 Observation start date DATE-END 2002-02-27T14:51:49 Observation end date RA PNT 31.414982102624 Pointing RA DEC PNT 64.819636886156 Pointing Dec ROLL PNT 308.95333572511 Pointing Roll RA TARG 31.408333 Observer’s specified target RA DEC TARG 64.823333 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T20:27:13 Date and time of file creation DATE-OBS 2002-02-27T07:41:01 Observation start date DATE-END 2002-02-27T14:51:49 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT 3C58 Source name TITLE MEASUREMENT OF P-DOT IN 3C58

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 2756 Observation id SEQ NUM 500206 Sequence number RA NOM 31.414982102624 Nominal RA DEC NOM 64.819636886156 Nominal Dec ROLL NOM 308.95333572511 Nominal Roll

Summary Page Created:Sat September 2, 2006 16:30 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500206

Instrument: HRC Obs ID: 2756 Source: 3C58 PI: Dr. Stephen Murray Title: MEASUREMENT OF P-DOT IN 3C58

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 30.885000 65.025160 1156.484863 73.568535 15.719830 31.048944 65.087502 987.423218 69.366455 14.234881 31.408014 64.828093 367.250000 29.957699 12.258952 30.972016 65.057078 868.775879 83.935226 10.350552 31.079484 65.076325 633.083313 75.463226 8.389296 31.691681 64.601121 442.250000 54.636124 8.094461 30.943568 65.049915 607.562500 77.842270 7.805046 31.863815 64.665170 430.958344 55.620880 7.748139 30.904513 65.012950 478.750000 75.226082 6.364149 31.772062 64.626756 335.458344 59.104858 5.675648