Summary Page Created:Tue September 19, 2006 06:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500298

Instrument: ACIS Obs ID: 3496 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

acisf03496N002 full img2.fits acisf03496N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 06:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500298

Instrument: ACIS Obs ID: 3496 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T09:37:58 Date and time of file creation DATE-OBS 2002-06-11T06:03:10 Observation start date DATE-END 2002-06-11T13:09:16 Observation end date RA PNT 344.3768192968 Pointing RA DEC PNT -41.030636627922 Pointing Dec ROLL PNT 105.03408727713 Pointing Roll RA TARG 344.377917 Observer’s specified target RA DEC TARG -41.040278 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T10:19:14 Date and time of file creation DATE-OBS 2002-06-11T06:03:10 Observation start date DATE-END 2002-06-11T13:09:16 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SN2001IG Source name TITLE SN2001IG: DETECTING A MASS LOSS PHASE?

Proposal title

OBSERVER Dr. Eric Schlegel Principal investigator OBS ID 3496 Observation id SEQ NUM 500298 Sequence number RA NOM 344.3768192968 Nominal RA DEC NOM -41.030636627922 Nominal Dec ROLL NOM 105.03408727713 Nominal Roll

Summary Page Created:Tue September 19, 2006 06:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500298

Instrument: ACIS Obs ID: 3496 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 344.370635 -41.036676 1395.142822 39.229836 35.563313 344.352979 -41.062174 1322.857178 39.492527 33.496391 344.415812 -41.174685 283.181824 20.093729 14.093045 344.347001 -41.020955 179.714279 15.661080 11.475216 344.350214 -40.722766 553.548157 52.603374 10.523054 344.195351 -40.755099 527.644531 53.178562 9.922128 344.321804 -40.990098 101.715912 12.132450 8.383789 344.349489 -41.048718 98.142860 11.759144 8.346089 344.325783 -40.723884 432.255829 52.074116 8.300780 344.238671 -40.742877 422.760803 53.827881 7.853937