Summary Page Created:Thu September 21, 2006 05:02 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600283

Instrument: ACIS Obs ID: 2946 Source: SMC FIELD 6 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

acisf02946N002 full img2.fits acisf02946N002 cntr img2.fits

Summary Page Created:Thu September 21, 2006 05:02 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600283

Instrument: ACIS Obs ID: 2946 Source: SMC FIELD 6 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T08:40:48 Date and time of file creation DATE-OBS 2002-07-04T06:48:04 Observation start date DATE-END 2002-07-04T09:47:57 Observation end date RA PNT 13.268313236745 Pointing RA DEC PNT -72.705062177594 Pointing Dec ROLL PNT 97.476237271875 Pointing Roll RA TARG 13.264167 Observer’s specified target RA DEC TARG -72.709583 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T09:01:35 Date and time of file creation DATE-OBS 2002-07-04T06:48:04 Observation start date DATE-END 2002-07-04T09:47:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT SMC FIELD 6 Source name TITLE A CHANDRA SURVEY OF THE SMC Proposal title

OBSERVER Dr. Andreas Zezas Principal investigator OBS ID 2946 Observation id SEQ NUM 600283 Sequence number RA NOM 13.268313236745 Nominal RA DEC NOM -72.705062177594 Nominal Dec ROLL NOM 97.476237271875 Nominal Roll

Summary Page Created:Thu September 21, 2006 05:02 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600283

Instrument: ACIS Obs ID: 2946 Source: SMC FIELD 6 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 13.037317 -72.634308 4246.534180 69.434418 61.158924 13.732572 -72.753055 456.943176 24.090296 18.967936 12.279603 -72.843252 309.484711 32.120335 9.635165 12.234734 -72.722809 197.687714 30.643831 6.451142 12.250743 -72.768183 178.435211 34.234760 5.212106 12.255613 -72.720996 155.604462 30.069294 5.174863 12.257385 -72.807107 140.388702 30.316998 4.630693 13.175854 -72.788827 38.791668 8.465053 4.582566 12.370641 -72.840149 128.216965 29.108839 4.404743 12.433857 -72.838947 117.000000 27.514608 4.252286