Summary Page Created:Thu September 21, 2006 05:29 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600285

Instrument: ACIS Obs ID: 2948 Source: SMC FIELD 3 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

acisf02948N002 full img2.fits acisf02948N002 cntr img2.fits

Summary Page Created:Thu September 21, 2006 05:29 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600285

Instrument: ACIS Obs ID: 2948 Source: SMC FIELD 3 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T09:11:43 Date and time of file creation DATE-OBS 2002-07-04T09:47:57 Observation start date DATE-END 2002-07-04T12:45:44 Observation end date RA PNT 14.192230250749 Pointing RA DEC PNT -72.302993009685 Pointing Dec ROLL PNT 98.368241963811 Pointing Roll RA TARG 14.188333 Observer’s specified target RA DEC TARG -72.3075 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T09:28:42 Date and time of file creation DATE-OBS 2002-07-04T09:47:57 Observation start date DATE-END 2002-07-04T12:45:44 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT SMC FIELD 3 Source name TITLE A CHANDRA SURVEY OF THE SMC Proposal title

OBSERVER Dr. Andreas Zezas Principal investigator OBS ID 2948 Observation id SEQ NUM 600285 Sequence number RA NOM 14.192230250749 Nominal RA DEC NOM -72.302993009685 Nominal Dec ROLL NOM 98.368241963811 Nominal Roll

Summary Page Created:Thu September 21, 2006 05:29 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600285

Instrument: ACIS Obs ID: 2948 Source: SMC FIELD 3 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 14.332670 -72.426075 310.333344 19.826735 15.652267 13.865521 -72.182749 235.539993 18.427223 12.782175 13.479324 -72.441490 301.317230 27.468445 10.969578 13.475116 -72.441897 291.386353 26.963411 10.806732 14.400004 -72.326120 119.000000 12.181630 9.768807 14.332788 -72.425846 173.443176 19.150017 9.057077 14.386172 -72.217378 93.487503 11.608575 8.053314 13.229096 -72.441821 235.840424 32.810524 7.187951 14.569901 -72.301538 83.089653 11.801857 7.040388 13.200322 -72.372488 181.415283 32.922798 5.510324