Summary Page Created:Mon October 9, 2006 11:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700411

Instrument: ACIS Obs ID: 2972 Source: LBQS 1235+1453 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

acisf02972N002 full img2.fits acisf02972N002 cntr img2.fits

Summary Page Created:Mon October 9, 2006 11:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700411

Instrument: ACIS Obs ID: 2972 Source: LBQS 1235+1453 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-09T15:38:01 Date and time of file creation DATE-OBS 2002-11-17T00:18:22 Observation start date DATE-END 2002-11-17T02:25:39 Observation end date RA PNT 189.40865068782 Pointing RA DEC PNT 14.617258328182 Pointing Dec ROLL PNT 52.807122168915 Pointing Roll RA TARG 189.401667 Observer’s specified target RA DEC TARG 14.611111 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-09T15:54:16 Date and time of file creation DATE-OBS 2002-11-17T00:18:22 Observation start date DATE-END 2002-11-17T02:25:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 1235+1453 Source name TITLE A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Proposal tit

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 2972 Observation id SEQ NUM 700411 Sequence number RA NOM 189.40865068782 Nominal RA DEC NOM 14.617258328182 Nominal Dec ROLL NOM 52.807122168915 Nominal Roll

Summary Page Created:Mon October 9, 2006 11:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700411

Instrument: ACIS Obs ID: 2972 Source: LBQS 1235+1453 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 189.650169 14.825679 155.093018 25.189106 6.157147 189.550320 14.897532 155.405319 25.616608 6.066585 189.400535 14.678115 48.397728 8.899154 5.438464 189.306133 14.593572 52.875000 9.865563 5.359552 189.521504 14.867435 99.034088 22.198931 4.461210 189.489615 14.829908 73.163567 16.410347 4.458380 189.569886 14.884362 113.807312 26.326227 4.322963 189.636679 14.805017 113.666962 26.813688 4.239140 189.358394 14.546045 33.625000 8.741825 3.846451 189.604461 14.858181 105.299004 28.697124 3.669322