Summary Page Created:Fri September 8, 2006 04:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700494

Instrument: ACIS Obs ID: 3055 Source: Q1231+481 PI: Dr. Willem De Vries Title: FRUSTRATED GPS QUASARS

acisf03055N002 full img2.fits acisf03055N002 cntr img2.fits

Summary Page Created:Fri September 8, 2006 04:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700494

Instrument: ACIS Obs ID: 3055 Source: Q1231+481 PI: Dr. Willem De Vries Title: FRUSTRATED GPS QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T08:32:27 Date and time of file creation DATE-OBS 2002-03-23T10:03:17 Observation start date DATE-END 2002-03-23T11:56:36 Observation end date RA PNT 188.54172826048 Pointing RA DEC PNT 47.900400678017 Pointing Dec ROLL PNT 171.97983439892 Pointing Roll RA TARG 188.555417 Observer’s specified target RA DEC TARG 47.897444 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T08:55:51 Date and time of file creation DATE-OBS 2002-03-23T10:03:17 Observation start date DATE-END 2002-03-23T11:56:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Q1231+481 Source name TITLE FRUSTRATED GPS QUASARS Proposal title OBSERVER Dr. Willem De Vries Principal investigator OBS ID 3055 Observation id SEQ NUM 700494 Sequence number RA NOM 188.54172826048 Nominal RA DEC NOM 47.900400678017 Nominal Dec ROLL NOM 171.97983439892 Nominal Roll

Summary Page Created:Fri September 8, 2006 04:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700494

Instrument: ACIS Obs ID: 3055 Source: Q1231+481 PI: Dr. Willem De Vries Title: FRUSTRATED GPS QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 188.555516 47.897600 797.142883 30.379868 26.239182 188.396119 47.966922 619.337952 28.025625 22.098988 188.364137 47.920267 46.041378 9.002446 5.114319 188.603940 47.915612 27.000000 6.711311 4.023059 188.562310 48.217091 69.205978 18.742069 3.692548 188.522472 48.153190 40.234482 11.829116 3.401309 188.657204 47.925475 20.916666 6.493425 3.221207 188.342298 47.897872 21.875000 6.801134 3.216375 188.599972 48.104393 27.332144 8.550466 3.196568