Summary Page Created:Thu October 5, 2006 12:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700502

Instrument: ACIS Obs ID: 3063 Source: HS 0017+2116 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03063N002 full img2.fits acisf03063N002 cntr img2.fits

Summary Page Created:Thu October 5, 2006 12:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700502

Instrument: ACIS Obs ID: 3063 Source: HS 0017+2116 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-05T15:47:31 Date and time of file creation DATE-OBS 2002-09-27T19:55:53 Observation start date DATE-END 2002-09-27T23:18:32 Observation end date RA PNT 5.0348450721411 Pointing RA DEC PNT 21.549601989185 Pointing Dec ROLL PNT 177.39441245281 Pointing Roll RA TARG 5.045 Observer’s specified target RA DEC TARG 21.5475 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-05T16:16:32 Date and time of file creation DATE-OBS 2002-09-27T19:55:53 Observation start date DATE-END 2002-09-27T23:18:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 0017+2116 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3063 Observation id SEQ NUM 700502 Sequence number RA NOM 5.0348450721411 Nominal RA DEC NOM 21.549601989185 Nominal Dec ROLL NOM 177.39441245281 Nominal Roll

Summary Page Created:Thu October 5, 2006 12:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700502

Instrument: ACIS Obs ID: 3063 Source: HS 0017+2116 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 4.704743 21.503125 247.916946 31.375067 7.901718 5.045083 21.547924 77.285713 11.254823 6.866897 4.711037 21.621020 221.684387 36.069180 6.146089 4.705243 21.523161 195.478409 32.176357 6.075219 5.064987 21.529317 51.714287 8.850558 5.843053 4.724120 21.621542 185.974106 36.390594 5.110499 5.022593 21.602981 43.397728 8.572998 5.062141 4.754478 21.497146 125.727272 25.134476 5.002184 4.724513 21.501644 167.455353 33.514267 4.996539 5.109601 21.687517 49.974998 10.035888 4.979630