Summary Page Created:Sat October 7, 2006 05:45 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700505

Instrument: ACIS Obs ID: 3066 Source: HS 0848+1119 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03066N002 full img2.fits acisf03066N002 cntr img2.fits

Summary Page Created:Sat October 7, 2006 05:45 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700505

Instrument: ACIS Obs ID: 3066 Source: HS 0848+1119 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T09:25:55 Date and time of file creation DATE-OBS 2002-10-19T12:47:00 Observation start date DATE-END 2002-10-19T14:55:14 Observation end date RA PNT 132.69445320508 Pointing RA DEC PNT 11.153339087347 Pointing Dec ROLL PNT 76.221211041379 Pointing Roll RA TARG 132.690417 Observer’s specified target RA DEC TARG 11.144528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T09:44:32 Date and time of file creation DATE-OBS 2002-10-19T12:47:00 Observation start date DATE-END 2002-10-19T14:55:14 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 0848+1119 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3066 Observation id SEQ NUM 700505 Sequence number RA NOM 132.69445320508 Nominal RA DEC NOM 11.153339087347 Nominal Dec ROLL NOM 76.221211041379 Nominal Roll

Summary Page Created:Sat October 7, 2006 05:45 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700505

Instrument: ACIS Obs ID: 3066 Source: HS 0848+1119 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 132.941298 11.155388 184.583328 17.408312 10.603172 132.672862 11.144647 83.000000 10.431157 7.956931 132.690636 11.144673 72.428574 10.287782 7.040251 132.827668 11.435296 140.508301 27.592869 5.092196 132.781436 11.447648 137.043182 27.224598 5.033800 132.708049 11.466221 114.780731 23.885431 4.805470 132.822940 11.418233 116.331253 27.754322 4.191464 132.814612 11.439940 114.049835 27.345041 4.170768 132.897645 11.070996 41.930233 10.054724 4.170202 132.939186 11.155406 61.254902 16.176855 3.786577