Summary Page Created:Fri September 8, 2006 04:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700506

Instrument: ACIS Obs ID: 3067 Source: HS 0854+0915 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03067N002 full img2.fits acisf03067N002 cntr img2.fits

Summary Page Created:Fri September 8, 2006 04:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700506

Instrument: ACIS Obs ID: 3067 Source: HS 0854+0915 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T08:25:51 Date and time of file creation DATE-OBS 2002-03-23T08:31:38 Observation start date DATE-END 2002-03-23T10:03:17 Observation end date RA PNT 134.34673618546 Pointing RA DEC PNT 9.0543678125601 Pointing Dec ROLL PNT 260.80058807993 Pointing Roll RA TARG 134.35 Observer’s specified target RA DEC TARG 9.063611 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T08:38:34 Date and time of file creation DATE-OBS 2002-03-23T08:31:38 Observation start date DATE-END 2002-03-23T10:03:17 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 0854+0915 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3067 Observation id SEQ NUM 700506 Sequence number RA NOM 134.34673618546 Nominal RA DEC NOM 9.0543678125601 Nominal Dec ROLL NOM 260.80058807993 Nominal Roll

Summary Page Created:Fri September 8, 2006 04:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700506

Instrument: ACIS Obs ID: 3067 Source: HS 0854+0915 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 134.431320 9.235066 138.269638 18.593241 7.436554 134.327746 9.251371 110.833336 16.327364 6.788195 134.394202 9.240473 100.500000 16.560814 6.068542 134.443996 9.232706 91.466965 15.308583 5.974881 134.404575 9.240022 100.958336 17.468836 5.779340 134.351189 9.233961 83.136360 14.613428 5.689039 134.344661 9.225215 90.462067 16.367971 5.526773 134.382252 9.218400 89.468964 16.401712 5.454855 134.315884 9.253494 89.992859 16.521465 5.447026 134.318852 9.228879 79.693184 14.951052 5.330273