Summary Page Created:Wed September 6, 2006 10:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700507

Instrument: ACIS Obs ID: 3068 Source: HS 1036+4008 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03068N002 full img2.fits acisf03068N002 cntr img2.fits

Summary Page Created:Wed September 6, 2006 10:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700507

Instrument: ACIS Obs ID: 3068 Source: HS 1036+4008 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T14:38:09 Date and time of file creation DATE-OBS 2002-03-11T04:24:52 Observation start date DATE-END 2002-03-11T06:29:29 Observation end date RA PNT 159.8794651096 Pointing RA DEC PNT 39.881162532059 Pointing Dec ROLL PNT 198.92527632385 Pointing Roll RA TARG 159.892083 Observer’s specified target RA DEC TARG 39.882722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T14:58:33 Date and time of file creation DATE-OBS 2002-03-11T04:24:52 Observation start date DATE-END 2002-03-11T06:29:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1036+4008 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3068 Observation id SEQ NUM 700507 Sequence number RA NOM 159.8794651096 Nominal RA DEC NOM 39.881162532059 Nominal Dec ROLL NOM 198.92527632385 Nominal Roll

Summary Page Created:Wed September 6, 2006 10:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700507

Instrument: ACIS Obs ID: 3068 Source: HS 1036+4008 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 160.184533 39.951253 852.541687 47.817322 17.829140 159.762642 39.912807 113.715912 12.661252 8.981411 159.479799 39.839910 175.259140 26.695877 6.565026 159.530473 39.724541 154.641190 26.060421 5.933949 159.844815 39.908620 47.714287 8.589310 5.555078 159.892177 39.882759 32.000000 7.138037 4.483026 159.523709 39.852863 104.208336 23.872978 4.365117 160.188849 39.953722 170.696548 40.396168 4.225563 159.566054 39.729594 98.333336 23.598763 4.166885 159.542947 39.725824 107.141075 25.954123 4.128094