Summary Page Created:Sat August 26, 2006 01:52 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700508

Instrument: ACIS Obs ID: 3069 Source: HS 1111+4033 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03069N002 full img2.fits acisf03069N002 cntr img2.fits

Summary Page Created:Sat August 26, 2006 01:52 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700508

Instrument: ACIS Obs ID: 3069 Source: HS 1111+4033 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-26T05:35:25 Date and time of file creation DATE-OBS 2002-01-10T20:53:49 Observation start date DATE-END 2002-01-11T00:00:45 Observation end date RA PNT 168.46306890962 Pointing RA DEC PNT 40.298817160186 Pointing Dec ROLL PNT 93.681710217807 Pointing Roll RA TARG 168.461667 Observer’s specified target RA DEC TARG 40.289167 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-26T05:51:00 Date and time of file creation DATE-OBS 2002-01-10T20:53:49 Observation start date DATE-END 2002-01-11T00:00:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1111+4033 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3069 Observation id SEQ NUM 700508 Sequence number RA NOM 168.46306890962 Nominal RA DEC NOM 40.298817160186 Nominal Dec ROLL NOM 93.681710217807 Nominal Roll

Summary Page Created:Sat August 26, 2006 01:52 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700508

Instrument: ACIS Obs ID: 3069 Source: HS 1111+4033 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 168.462299 40.289303 247.428574 17.178526 14.403365 168.545426 40.109501 238.681244 23.609680 10.109466 168.412300 40.103662 222.369644 25.783405 8.624526 168.514073 40.606448 297.900330 36.227516 8.223041 168.555978 40.167977 112.863640 14.636716 7.710994 168.564864 40.111402 137.601791 19.235205 7.153643 168.466464 40.106624 166.666672 23.590204 7.065080 168.433541 40.104433 150.333328 22.423555 6.704259 168.495205 40.107590 134.541672 20.486446 6.567350 168.353507 40.599334 191.056473 29.311525 6.518135