Summary Page Created:Fri September 22, 2006 19:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700510

Instrument: ACIS Obs ID: 3071 Source: HS 1229+4807 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03071N002 full img2.fits acisf03071N002 cntr img2.fits

Summary Page Created:Fri September 22, 2006 19:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700510

Instrument: ACIS Obs ID: 3071 Source: HS 1229+4807 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-22T22:51:34 Date and time of file creation DATE-OBS 2002-07-14T22:06:46 Observation start date DATE-END 2002-07-15T00:25:05 Observation end date RA PNT 187.90540878103 Pointing RA DEC PNT 47.838687743611 Pointing Dec ROLL PNT 266.6001140392 Pointing Roll RA TARG 187.90875 Observer’s specified target RA DEC TARG 47.848056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-22T23:10:51 Date and time of file creation DATE-OBS 2002-07-14T22:06:46 Observation start date DATE-END 2002-07-15T00:25:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1229+4807 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3071 Observation id SEQ NUM 700510 Sequence number RA NOM 187.90540878103 Nominal RA DEC NOM 47.838687743611 Nominal Dec ROLL NOM 266.6001140392 Nominal Roll

Summary Page Created:Fri September 22, 2006 19:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700510

Instrument: ACIS Obs ID: 3071 Source: HS 1229+4807 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.908758 47.847982 127.142860 13.036901 9.752537 187.789860 47.537254 246.946838 27.685823 8.919613 187.971134 47.531104 233.176086 27.294329 8.543023 187.684085 47.873739 88.257500 12.749248 6.922565 188.000113 47.854651 52.318180 9.021150 5.799502 187.857248 47.837142 47.714287 8.589310 5.555078 187.582621 47.787617 75.581779 13.721488 5.508279 187.575622 47.740090 64.458336 13.435086 4.797761 187.983250 47.618501 79.129654 16.806133 4.708379 187.970982 47.733277 44.180000 9.405057 4.697473