Summary Page Created:Wed July 19, 2006 09:42 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700511

Instrument: ACIS Obs ID: 3072 Source: HS 1230+4741 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03072N002 full img2.fits acisf03072N002 cntr img2.fits

Summary Page Created:Wed July 19, 2006 09:42 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700511

Instrument: ACIS Obs ID: 3072 Source: HS 1230+4741 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-19T13:14:56 Date and time of file creation DATE-OBS 2003-01-27T09:01:34 Observation start date DATE-END 2003-01-27T12:12:35 Observation end date RA PNT 188.25738676625 Pointing RA DEC PNT 47.425033360659 Pointing Dec ROLL PNT 100.29865820874 Pointing Roll RA TARG 188.2575 Observer’s specified target RA DEC TARG 47.415417 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-19T13:40:50 Date and time of file creation DATE-OBS 2003-01-27T09:01:34 Observation start date DATE-END 2003-01-27T12:12:35 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1230+4741 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3072 Observation id SEQ NUM 700511 Sequence number RA NOM 188.25738676625 Nominal RA DEC NOM 47.425033360659 Nominal Dec ROLL NOM 100.29865820874 Nominal Roll

Summary Page Created:Wed July 19, 2006 09:42 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700511

Instrument: ACIS Obs ID: 3072 Source: HS 1230+4741 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 188.257419 47.415434 543.000000 24.988785 21.729748 188.085065 47.713307 291.272430 29.924770 9.733489 188.312228 47.423498 115.000000 13.105589 8.774882 188.265647 47.733000 249.478409 33.038696 7.551097 188.253827 47.324341 79.954544 11.384517 7.023095 188.232117 47.547050 73.477272 10.468000 7.019228 188.170452 47.725289 218.664459 34.739677 6.294372 188.088075 47.702093 184.324112 31.407078 5.868872 188.357428 47.364046 61.583332 10.520150 5.853845 188.413679 47.533742 55.282501 9.905658 5.580902