Summary Page Created:Thu July 27, 2006 11:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700513

Instrument: ACIS Obs ID: 3074 Source: HS 1251+2636 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03074N002 full img2.fits acisf03074N002 cntr img2.fits

Summary Page Created:Thu July 27, 2006 11:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700513

Instrument: ACIS Obs ID: 3074 Source: HS 1251+2636 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-27T15:24:08 Date and time of file creation DATE-OBS 2003-02-17T17:51:54 Observation start date DATE-END 2003-02-17T20:04:48 Observation end date RA PNT 193.59520960878 Pointing RA DEC PNT 26.344583051164 Pointing Dec ROLL PNT 101.39229352137 Pointing Roll RA TARG 193.595417 Observer’s specified target RA DEC TARG 26.334972 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-27T15:49:54 Date and time of file creation DATE-OBS 2003-02-17T17:51:54 Observation start date DATE-END 2003-02-17T20:04:48 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1251+2636 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3074 Observation id SEQ NUM 700513 Sequence number RA NOM 193.59520960878 Nominal RA DEC NOM 26.344583051164 Nominal Dec ROLL NOM 101.39229352137 Nominal Roll

Summary Page Created:Thu July 27, 2006 11:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700513

Instrument: ACIS Obs ID: 3074 Source: HS 1251+2636 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 193.630969 26.344646 164.142853 14.490862 11.327335 193.595189 26.334763 92.142860 11.475044 8.029848 193.463784 26.632218 142.405319 25.347994 5.618011 193.593867 26.652633 138.265778 26.544184 5.208892 193.541297 26.645189 128.615173 25.645151 5.015185 193.677789 26.284361 42.556820 8.774239 4.850201 193.566848 26.651581 123.578072 26.654434 4.636304 193.615229 26.581309 72.784317 15.791016 4.609223 193.580553 26.652334 130.910294 28.836292 4.539776 193.462153 26.615921 97.812500 23.794731 4.110679