Summary Page Created:Tue September 19, 2006 10:37 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800185

Instrument: ACIS Obs ID: 3185 Source: A907 PI: Dr. Stephen Murray Title: A DETAILED STUDY OF THE CLUSTER A907

acisf03185N002 full img2.fits acisf03185N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 10:37 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800185

Instrument: ACIS Obs ID: 3185 Source: A907 PI: Dr. Stephen Murray Title: A DETAILED STUDY OF THE CLUSTER A907

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T14:02:44 Date and time of file creation DATE-OBS 2002-06-14T07:35:12 Observation start date DATE-END 2002-06-14T21:31:51 Observation end date RA PNT 149.57188025113 Pointing RA DEC PNT -11.096278306738 Pointing Dec ROLL PNT 241.93303524031 Pointing Roll RA TARG 149.591667 Observer’s specified target RA DEC TARG -11.064 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T14:36:00 Date and time of file creation DATE-OBS 2002-06-14T07:35:12 Observation start date DATE-END 2002-06-14T21:31:51 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A907 Source name TITLE A DETAILED STUDY OF THE CLUSTER A907

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 3185 Observation id SEQ NUM 800185 Sequence number RA NOM 149.57188025113 Nominal RA DEC NOM -11.096278306738 Nominal Dec ROLL NOM 241.93303524031 Nominal Roll

Summary Page Created:Tue September 19, 2006 10:37 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800185

Instrument: ACIS Obs ID: 3185 Source: A907 PI: Dr. Stephen Murray Title: A DETAILED STUDY OF THE CLUSTER A907

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 149.672756 -11.073981 630.147705 27.225897 23.145159 149.567168 -11.077563 177.000000 15.451519 11.455184 149.620163 -11.045055 117.285713 13.060568 8.980139 149.489039 -11.192243 94.352272 12.482876 7.558537 149.426270 -11.056893 97.261360 14.395153 6.756536 149.520799 -10.936688 106.358620 15.883531 6.696157 149.543007 -10.937850 78.334999 13.259492 5.907843 149.458427 -11.180447 68.068184 12.053467 5.647187 149.523594 -10.930480 72.220688 13.068810 5.526187 149.606897 -11.082311 50.142857 9.208853 5.445071