Summary Page Created:Thu September 21, 2006 01:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3710 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

acisf03710N002 full img2.fits acisf03710N002 cntr img2.fits

Summary Page Created:Thu September 21, 2006 01:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3710 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T05:05:40 Date and time of file creation DATE-OBS 2002-06-26T15:51:10 Observation start date DATE-END 2002-06-27T04:50:02 Observation end date RA PNT 15.456633719756 Pointing RA DEC PNT -21.817556141683 Pointing Dec ROLL PNT 115.47909951559 Pointing Roll RA TARG 15.67 Observer’s specified target RA DEC TARG -21.878 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T05:37:19 Date and time of file creation DATE-OBS 2002-06-26T15:51:10 Observation start date DATE-END 2002-06-27T04:50:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A133 OFFSET Source name TITLE DEEP X-RAY IMAGE OF A133 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 3710 Observation id SEQ NUM 800183 Sequence number RA NOM 15.456633719756 Nominal RA DEC NOM -21.817556141683 Nominal Dec ROLL NOM 115.47909951559 Nominal Roll

Summary Page Created:Thu September 21, 2006 01:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3710 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.292466 -21.746695 541.496582 27.456484 19.721992 15.416440 -21.905348 109.636360 12.398605 8.842637 15.662430 -21.873880 244.275894 30.001842 8.142030 15.475209 -21.899767 91.708336 11.673079 7.856397 15.313775 -21.770495 106.147728 13.747390 7.721301 15.368602 -21.799604 82.750000 11.124063 7.438829 15.383455 -21.902397 87.769997 12.178584 7.206913 15.659623 -21.872289 254.166672 35.580013 7.143523 15.447666 -21.876749 75.477272 10.573627 7.138258 15.181152 -21.895556 158.545456 24.318647 6.519502