Summary Page Created:Fri September 22, 2006 20:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 900136

Instrument: ACIS Obs ID: 3297 Source: H134824 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

acisf03297N002 full img2.fits acisf03297N002 cntr img2.fits

Summary Page Created:Fri September 22, 2006 20:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 900136

Instrument: ACIS Obs ID: 3297 Source: H134824 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-22T23:51:38 Date and time of file creation DATE-OBS 2002-07-16T02:21:51 Observation start date DATE-END 2002-07-16T03:13:43 Observation end date RA PNT 207.09799173141 Pointing RA DEC PNT -30.433669211695 Pointing Dec ROLL PNT 252.3575978268 Pointing Roll RA TARG 207.10125 Observer’s specified target RA DEC TARG -30.429722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-23T00:24:12 Date and time of file creation DATE-OBS 2002-07-16T02:21:51 Observation start date DATE-END 2002-07-16T03:13:43 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT H134824 Source name TITLE A CHEAP COMPLETE WIDE BRIGHT SURVEY

Proposal title

OBSERVER DR. FABIO LA FRANCA Principal investigator OBS ID 3297 Observation id SEQ NUM 900136 Sequence number RA NOM 207.09799173141 Nominal RA DEC NOM -30.433669211695 Nominal Dec ROLL NOM 252.3575978268 Nominal Roll

Summary Page Created:Fri September 22, 2006 20:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 900136

Instrument: ACIS Obs ID: 3297 Source: H134824 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.186313 -30.495653 162.636368 14.531247 11.192182 207.461500 -30.471525 45.561462 13.603658 3.349207 206.917486 -30.462531 20.897499 6.312524 3.310482