Summary Page Created:Sat July 22, 2006 11:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500302

Instrument: ACIS Obs ID: 3514 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

acisf03514N002 full img2.fits acisf03514N002 cntr img2.fits

Summary Page Created:Sat July 22, 2006 11:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500302

Instrument: ACIS Obs ID: 3514 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-22T15:34:25 Date and time of file creation DATE-OBS 2003-03-08T09:09:11 Observation start date DATE-END 2003-03-08T11:03:02 Observation end date RA PNT 244.449207167 Pointing RA DEC PNT -50.926662981752 Pointing Dec ROLL PNT 76.174496563077 Pointing Roll RA TARG 244.40125 Observer’s specified target RA DEC TARG -51.040278 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-22T15:49:16 Date and time of file creation DATE-OBS 2003-03-08T09:09:11 Observation start date DATE-END 2003-03-08T11:03:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE OBSERVATION OF SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 3514 Observation id SEQ NUM 500302 Sequence number RA NOM 244.449207167 Nominal RA DEC NOM -50.926662981752 Nominal Dec ROLL NOM 76.174496563077 Nominal Roll

Summary Page Created:Sat July 22, 2006 11:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500302

Instrument: ACIS Obs ID: 3514 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400812 -51.040210 1968.331055 49.741802 39.570961 244.285899 -51.032987 118.522728 17.607691 6.731305 244.303827 -51.037938 117.306816 26.587545 4.412097 244.351563 -51.041240 82.041664 19.780739 4.147553 244.305766 -51.022331 99.500000 24.564714 4.050525 244.352872 -51.040912 70.988640 17.848158 3.977365 244.374469 -51.039715 58.238636 16.200541 3.594858 244.305649 -51.024613 86.958336 25.955788 3.350248 244.318695 -51.037949 92.443184 27.884958 3.315163 244.308623 -51.031611 96.886360 30.535559 3.172903