Summary Page Created:Sun October 15, 2006 01:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700713

Instrument: ACIS Obs ID: 4034 Source: 2MASS074825+694712 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04034N002 full img2.fits acisf04034N002 cntr img2.fits

Summary Page Created:Sun October 15, 2006 01:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700713

Instrument: ACIS Obs ID: 4034 Source: 2MASS074825+694712 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-15T05:13:54 Date and time of file creation DATE-OBS 2002-12-19T03:18:42 Observation start date DATE-END 2002-12-19T04:57:50 Observation end date RA PNT 117.08588887191 Pointing RA DEC PNT 69.793822956146 Pointing Dec ROLL PNT 142.6821461595 Pointing Roll RA TARG 117.105 Observer’s specified target RA DEC TARG 69.786722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-15T05:48:34 Date and time of file creation DATE-OBS 2002-12-19T03:18:42 Observation start date DATE-END 2002-12-19T04:57:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS074825+694712 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4034 Observation id SEQ NUM 700713 Sequence number RA NOM 117.08588887191 Nominal RA DEC NOM 69.793822956146 Nominal Dec ROLL NOM 142.6821461595 Nominal Roll

Summary Page Created:Sun October 15, 2006 01:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700713

Instrument: ACIS Obs ID: 4034 Source: 2MASS074825+694712 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 117.429742 69.640250 48.666668 9.536638 5.103126 116.487794 70.026951 105.677742 20.943903 5.045752 117.113771 69.806357 38.714287 7.964713 4.860726 117.104951 69.786759 37.714287 7.891706 4.778977 116.342210 69.961745 80.009964 22.945847 3.486904 116.339148 69.912408 75.416664 21.759251 3.465959 117.269435 69.913311 21.916666 6.585412 3.328063 116.568328 69.935490 47.310505 14.558586 3.249664 117.301894 70.044507 29.352272 9.127013 3.215978 117.052807 69.737323 18.000000 5.600033 3.214267