Summary Page Created:Sat October 14, 2006 16:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700729

Instrument: ACIS Obs ID: 4050 Source: 2MASS202421-572344 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04050N003 full img2.fits acisf04050N003 cntr img2.fits

Summary Page Created:Sat October 14, 2006 16:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700729

Instrument: ACIS Obs ID: 4050 Source: 2MASS202421-572344 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T20:32:42 Date and time of file creation DATE-OBS 2002-12-07T14:53:28 Observation start date DATE-END 2002-12-07T16:07:46 Observation end date RA PNT 306.07627370137 Pointing RA DEC PNT -57.403641414742 Pointing Dec ROLL PNT 249.77101793753 Pointing Roll RA TARG 306.085417 Observer’s specified target RA DEC TARG -57.395444 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T20:50:23 Date and time of file creation DATE-OBS 2002-12-07T14:53:28 Observation start date DATE-END 2002-12-07T16:07:46 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS202421-572344 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4050 Observation id SEQ NUM 700729 Sequence number RA NOM 306.07627370137 Nominal RA DEC NOM -57.403641414742 Nominal Dec ROLL NOM 249.77101793753 Nominal Roll

Summary Page Created:Sat October 14, 2006 16:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700729

Instrument: ACIS Obs ID: 4050 Source: 2MASS202421-572344 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 306.085620 -57.395409 477.142853 24.297819 19.637270 305.988198 -57.710867 131.976746 20.630566 6.397146 305.773248 -57.665969 81.059799 20.007853 4.051399 305.792340 -57.634192 68.416664 17.331377 3.947561 305.783262 -57.655485 69.791962 19.663816 3.549258 306.035822 -57.653156 48.916668 13.947632 3.507166 305.819816 -57.678115 77.398674 23.299137 3.321954 305.802901 -57.619717 48.318180 15.925684 3.033978 305.910181 -57.659742 55.659092 18.499901 3.008616