Summary Page Created:Thu July 6, 2006 01:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700760

Instrument: ACIS Obs ID: 4081 Source: SDSS J015652.43-001222.0 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

acisf04081N002 full img2.fits acisf04081N002 cntr img2.fits

Summary Page Created:Thu July 6, 2006 01:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700760

Instrument: ACIS Obs ID: 4081 Source: SDSS J015652.43-001222.0 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-06T04:04:34 Date and time of file creation DATE-OBS 2003-09-10T06:14:00 Observation start date DATE-END 2003-09-10T07:07:54 Observation end date RA PNT 29.262381441044 Pointing RA DEC PNT -0.14594354284329 Pointing Dec ROLL PNT 97.685429153602 Pointing Roll RA TARG 29.218333 Observer’s specified target RA DEC TARG -0.206111 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-06T05:08:15 Date and time of file creation DATE-OBS 2003-09-10T06:14:00 Observation start date DATE-END 2003-09-10T07:07:54 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SDSS J015652.43-001222.0 Source name TITLE ARE ALL NARROW- LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Proposal t

OBSERVER Prof RICHARD POGGE Principal investigator OBS ID 4081 Observation id SEQ NUM 700760 Sequence number RA NOM 29.262381441044 Nominal RA DEC NOM -0.14594354284329 Nominal Dec ROLL NOM 97.685429153602 Nominal Roll

Summary Page Created:Thu July 6, 2006 01:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700760

Instrument: ACIS Obs ID: 4081 Source: SDSS J015652.43-001222.0 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 29.177321 0.148324 79.205978 19.026321 4.162969 29.165687 0.110795 53.208332 15.474483 3.438456 29.240939 0.047979 27.583334 8.489096 3.249266