Summary Page Created:Sat July 22, 2006 06:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700767

Instrument: ACIS Obs ID: 4088 Source: SDSS J125943.59+010255.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

acisf04088N002 full img2.fits acisf04088N002 cntr img2.fits

Summary Page Created:Sat July 22, 2006 06:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700767

Instrument: ACIS Obs ID: 4088 Source: SDSS J125943.59+010255.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-22T10:42:20 Date and time of file creation DATE-OBS 2003-03-02T15:38:37 Observation start date DATE-END 2003-03-02T16:37:56 Observation end date RA PNT 194.99321571878 Pointing RA DEC PNT 1.090871149178 Pointing Dec ROLL PNT 78.273170139562 Pointing Roll RA TARG 194.931667 Observer’s specified target RA DEC TARG 1.048639 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-22T10:54:26 Date and time of file creation DATE-OBS 2003-03-02T15:38:37 Observation start date DATE-END 2003-03-02T16:37:56 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SDSS J125943.59+010255.1 Source name TITLE ARE ALL NARROW- LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Proposal t

OBSERVER Prof RICHARD POGGE Principal investigator OBS ID 4088 Observation id SEQ NUM 700767 Sequence number RA NOM 194.99321571878 Nominal RA DEC NOM 1.090871149178 Nominal Dec ROLL NOM 78.273170139562 Nominal Roll

Summary Page Created:Sat July 22, 2006 06:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700767

Instrument: ACIS Obs ID: 4088 Source: SDSS J125943.59+010255.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 195.017599 1.173643 34.791668 8.188111 4.249046 194.993723 1.397691 63.568108 15.403205 4.126940 195.126189 1.046414 22.000000 6.019927 3.654530 194.983849 1.361693 42.977272 12.869074 3.339578 195.039746 1.071715 20.079546 6.053830 3.316833 195.061921 1.294197 33.089703 10.958642 3.019508