Summary Page Created:Fri July 14, 2006 11:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 900317

Instrument: ACIS Obs ID: 4274 Source: PKS0537-28 2 PI: Dr. Fabrizio Fiore Title: CHASING QUASAR 2

acisf04274N002 full img2.fits acisf04274N002 cntr img2.fits

Summary Page Created:Fri July 14, 2006 11:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 900317

Instrument: ACIS Obs ID: 4274 Source: PKS0537-28 2 PI: Dr. Fabrizio Fiore Title: CHASING QUASAR 2

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-14T15:04:06 Date and time of file creation DATE-OBS 2003-07-21T14:25:04 Observation start date DATE-END 2003-07-21T23:09:03 Observation end date RA PNT 85.018328723489 Pointing RA DEC PNT -28.745938667521 Pointing Dec ROLL PNT 141.32615103166 Pointing Roll RA TARG 85.020833 Observer’s specified target RA DEC TARG -28.75 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-14T15:25:52 Date and time of file creation DATE-OBS 2003-07-21T14:25:04 Observation start date DATE-END 2003-07-21T23:09:03 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT PKS0537-28 2 Source name TITLE CHASING QUASAR 2 Proposal title OBSERVER Dr. Fabrizio Fiore Principal investigator OBS ID 4274 Observation id SEQ NUM 900317 Sequence number RA NOM 85.018328723489 Nominal RA DEC NOM -28.745938667521 Nominal Dec ROLL NOM 141.32615103166 Nominal Roll

Summary Page Created:Fri July 14, 2006 11:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 900317

Instrument: ACIS Obs ID: 4274 Source: PKS0537-28 2 PI: Dr. Fabrizio Fiore Title: CHASING QUASAR 2

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 84.976200 -28.665696 3140.958252 61.704029 50.903618 84.848083 -28.706252 279.924988 20.056145 13.957069 84.888743 -29.048754 688.543884 55.555912 12.393711 84.958287 -28.642232 174.137924 15.940414 10.924304 84.996051 -28.631325 130.096558 13.889618 9.366460 84.969963 -28.785896 106.318184 11.889584 8.942128 84.987273 -28.840684 115.954544 13.002127 8.918121 84.781174 -28.974773 437.584717 49.660965 8.811442 85.226028 -28.730045 125.659088 15.740778 7.983029 84.816942 -29.000199 443.661133 56.234749 7.889448