Summary Page Created:Mon June 26, 2006 14:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5263 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf05263N002 full img2.fits acisf05263N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 14:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5263 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T18:29:43 Date and time of file creation DATE-OBS 2003-11-24T09:54:47 Observation start date DATE-END 2003-11-24T10:24:47 Observation end date RA PNT 287.89379625558 Pointing RA DEC PNT 16.902415364694 Pointing Dec ROLL PNT 314.14799300186 Pointing Roll RA TARG 287.8643 Observer’s specified target RA DEC TARG 16.93407 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T18:42:46 Date and time of file creation DATE-OBS 2003-11-24T09:54:47 Observation start date DATE-END 2003-11-24T10:24:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 5263 Observation id SEQ NUM 100051 Sequence number RA NOM 287.89379625558 Nominal RA DEC NOM 16.902415364694 Nominal Dec ROLL NOM 314.14799300186 Nominal Roll

Summary Page Created:Mon June 26, 2006 14:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5263 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 287.796953 17.084012 28.027679 6.838121 4.098740 287.732670 17.076713 31.313726 8.235350 3.802356 287.723190 17.068127 29.352942 8.239423 3.562500 287.783759 17.034422 29.082758 8.733677 3.329956 287.709983 16.999528 25.221428 7.821752 3.224524 287.790192 17.075739 21.083036 6.622093 3.183742 287.789758 17.042438 21.020689 6.648633 3.161656 287.696863 17.042653 24.392157 8.027425 3.038603