Summary Page Created:Mon June 26, 2006 14:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5265 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf05265N002 full img2.fits acisf05265N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 14:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5265 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T18:29:03 Date and time of file creation DATE-OBS 2003-11-24T10:54:47 Observation start date DATE-END 2003-11-24T11:24:47 Observation end date RA PNT 287.80623409966 Pointing RA DEC PNT 16.82677257731 Pointing Dec ROLL PNT 314.14786376938 Pointing Roll RA TARG 287.77605 Observer’s specified target RA DEC TARG 16.85905 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T18:41:56 Date and time of file creation DATE-OBS 2003-11-24T10:54:47 Observation start date DATE-END 2003-11-24T11:24:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 5265 Observation id SEQ NUM 100051 Sequence number RA NOM 287.80623409966 Nominal RA DEC NOM 16.82677257731 Nominal Dec ROLL NOM 314.14786376938 Nominal Roll

Summary Page Created:Mon June 26, 2006 14:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5265 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 287.623896 16.928764 51.719643 11.506506 4.494817 287.689189 16.988221 44.291668 10.444184 4.240797 287.638811 16.909786 25.795454 8.013676 3.218929 287.718314 16.994086 21.397728 6.919258 3.092489 287.593147 16.967018 17.958334 5.957597 3.014359