Summary Page Created:Mon June 26, 2006 16:15 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5275 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf05275N002 full img2.fits acisf05275N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 16:15 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5275 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T19:55:16 Date and time of file creation DATE-OBS 2003-11-24T15:54:47 Observation start date DATE-END 2003-11-24T16:24:47 Observation end date RA PNT 287.36230719784 Pointing RA DEC PNT 16.457017583712 Pointing Dec ROLL PNT 314.14809112707 Pointing Roll RA TARG 287.33218 Observer’s specified target RA DEC TARG 16.4893 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T20:13:51 Date and time of file creation DATE-OBS 2003-11-24T15:54:47 Observation start date DATE-END 2003-11-24T16:24:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 5275 Observation id SEQ NUM 100051 Sequence number RA NOM 287.36230719784 Nominal RA DEC NOM 16.457017583712 Nominal Dec ROLL NOM 314.14809112707 Nominal Roll

Summary Page Created:Mon June 26, 2006 16:15 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5275 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 287.226482 16.578006 31.954546 8.699353 3.673209 287.236321 16.610008 25.583334 8.351000 3.063505