Summary Page Created:Wed April 26, 2006 15:41 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 400330

Instrument: ACIS Obs ID: 4453 Source: V 4641 Sgr PI: Dr Peter Jonker Title: Following a black hole candidate soft X-ray transient returning to quiescence

acisf04453N002 full img2.fits acisf04453N002 cntr img2.fits

Summary Page Created:Wed April 26, 2006 15:41 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 400330

Instrument: ACIS Obs ID: 4453 Source: V 4641 Sgr PI: Dr Peter Jonker Title: Following a black hole candidate soft X-ray transient returning to quiescence

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T17:05:50 Date and time of file creation DATE-OBS 2004-08-10T04:14:58 Observation start date DATE-END 2004-08-10T16:16:40 Observation end date RA PNT 274.83887383604 Pointing RA DEC PNT -25.416261234336 Pointing Dec ROLL PNT 274.28468244063 Pointing Roll RA TARG 274.84 Observer’s specified target RA DEC TARG -25.407167 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T19:40:13 Date and time of file creation DATE-OBS 2004-08-10T04:14:58 Observation start date DATE-END 2004-08-10T16:16:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT V 4641 Sgr Source name TITLE Following a black hole candidate soft X-ray transient returning to quiescence

Proposal title

OBSERVER Dr Peter Jonker Principal investigator OBS ID 4453 Observation id SEQ NUM 400330 Sequence number RA NOM 274.83887383604 Nominal RA DEC NOM -25.416261234336 Nominal Dec ROLL NOM 274.28468244063 Nominal Roll

Summary Page Created:Wed April 26, 2006 15:41 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 400330

Instrument: ACIS Obs ID: 4453 Source: V 4641 Sgr PI: Dr Peter Jonker Title: Following a black hole candidate soft X-ray transient returning to quiescence

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 274.840557 -25.433631 1218.142822 38.063843 32.002625 274.837679 -25.426759 40.285713 9.225780 4.366646 274.837148 -25.342779 48.208332 13.305108 3.623295 274.839677 -25.344077 45.375000 12.817048 3.540207 274.839688 -25.344435 38.142857 12.102370 3.151685 274.833284 -25.373502 21.428572 6.883418 3.113071 274.847393 -25.440941 21.428572 6.883418 3.113071 274.823605 -25.331688 29.750000 9.705761 3.065190