Summary Page Created:Sat April 29, 2006 05:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 400333

Instrument: ACIS Obs ID: 4550 Source: 1RXS J175428.3-262035 PI: Dr Mariano Mendez Title: Low-luminosity X-ray binaries

acisf04550N002 full img2.fits acisf04550N002 cntr img2.fits

Summary Page Created:Sat April 29, 2006 05:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 400333

Instrument: ACIS Obs ID: 4550 Source: 1RXS J175428.3-262035 PI: Dr Mariano Mendez Title: Low-luminosity X-ray binaries

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T07:37:12 Date and time of file creation DATE-OBS 2004-07-03T12:01:46 Observation start date DATE-END 2004-07-03T17:53:06 Observation end date RA PNT 268.61828756224 Pointing RA DEC PNT -26.352712849394 Pointing Dec ROLL PNT 282.05125225352 Pointing Roll RA TARG 268.617917 Observer’s specified target RA DEC TARG -26.343056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.92967224 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T09:00:18 Date and time of file creation DATE-OBS 2004-07-03T12:01:46 Observation start date DATE-END 2004-07-03T17:53:06 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 1RXS J175428.3-262035 Source name TITLE Low-luminosity X-ray binaries Proposal title OBSERVER Dr Mariano Mendez Principal investigator OBS ID 4550 Observation id SEQ NUM 400333 Sequence number RA NOM 268.61828756224 Nominal RA DEC NOM -26.352712849394 Nominal Dec ROLL NOM 282.05125225352 Nominal Roll

Summary Page Created:Sat April 29, 2006 05:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 400333

Instrument: ACIS Obs ID: 4550 Source: 1RXS J175428.3-262035 PI: Dr Mariano Mendez Title: Low-luminosity X-ray binaries

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 268.756287 -26.639523 462.528229 43.463581 10.641743 268.620527 -26.660431 472.189362 49.531433 9.533125 268.605205 -26.331154 365.571442 42.062595 8.691129 268.668502 -26.237868 126.534088 16.438253 7.697538 268.683685 -26.652607 370.790710 51.307999 7.226762 268.640024 -26.659905 389.162781 54.232140 7.175870 268.618800 -26.646734 350.695526 51.180813 6.852090 268.751978 -26.615244 309.333344 47.605896 6.497795 268.752354 -26.622755 334.498199 51.575451 6.485610 268.613495 -26.631140 299.333344 46.940033 6.376931