Summary Page Created:Sat April 15, 2006 05:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500424

Instrument: ACIS Obs ID: 4599 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

acisf04599N003 full img2.fits acisf04599N003 cntr img2.fits

Summary Page Created:Sat April 15, 2006 05:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500424

Instrument: ACIS Obs ID: 4599 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-15T08:54:49 Date and time of file creation DATE-OBS 2004-10-19T12:58:34 Observation start date DATE-END 2004-10-19T14:57:33 Observation end date RA PNT 244.28598872819 Pointing RA DEC PNT -51.13302670694 Pointing Dec ROLL PNT 233.03582754102 Pointing Roll RA TARG 244.40125 Observer’s specified target RA DEC TARG -51.040278 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-15T09:31:12 Date and time of file creation DATE-OBS 2004-10-19T12:58:34 Observation start date DATE-END 2004-10-19T14:57:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE Observation of SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 4599 Observation id SEQ NUM 500424 Sequence number RA NOM 244.28598872819 Nominal RA DEC NOM -51.13302670694 Nominal Dec ROLL NOM 233.03582754102 Nominal Roll

Summary Page Created:Sat April 15, 2006 05:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500424

Instrument: ACIS Obs ID: 4599 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400979 -51.040221 1193.917236 39.450085 30.263998 244.489875 -51.092785 52.000000 11.624201 4.473426 244.484041 -51.060834 119.761360 28.524433 4.198554 244.505009 -51.071980 90.636360 21.781906 4.161085 244.438687 -51.055405 85.840912 21.224236 4.044476 244.497248 -51.067215 86.954544 21.865232 3.976841 244.468464 -51.071318 117.791664 32.207996 3.657218 244.469854 -51.087238 94.977272 26.880421 3.533325 244.466207 -51.071417 95.613640 27.168369 3.519300 244.437240 -51.065216 83.524139 24.262486 3.442522