Summary Page Created:Sun April 16, 2006 18:45 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600376

Instrument: ACIS Obs ID: 4721 Source: M31-bulge PI: Dr. MICHAEL GARCIA Title: Black Hole X-ray Novae in M31

acisf04721N002 e2 full img2.fits acisf04721N002 e2 cntr img2.fits

Summary Page Created:Sun April 16, 2006 18:45 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600376

Instrument: ACIS Obs ID: 4721 Source: M31-bulge PI: Dr. MICHAEL GARCIA Title: Black Hole X-ray Novae in M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-16T22:01:56 Date and time of file creation DATE-OBS 2004-10-04T20:39:33 Observation start date DATE-END 2004-10-04T22:37:57 Observation end date RA PNT 10.667693169347 Pointing RA DEC PNT 41.270613442193 Pointing Dec ROLL PNT 180.54708022259 Pointing Roll RA TARG 10.684583 Observer’s specified target RA DEC TARG 41.269 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-16T22:44:26 Date and time of file creation DATE-OBS 2004-10-04T20:39:33 Observation start date DATE-END 2004-10-04T22:37:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT M31-bulge Source name TITLE Black Hole X-ray Novae in M31 Proposal title OBSERVER Dr. MICHAEL GARCIA Principal investigator OBS ID 4721 Observation id SEQ NUM 600376 Sequence number RA NOM 10.667693169347 Nominal RA DEC NOM 41.270613442193 Nominal Dec ROLL NOM 180.54708022259 Nominal Roll

Summary Page Created:Sun April 16, 2006 18:45 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600376

Instrument: ACIS Obs ID: 4721 Source: M31-bulge PI: Dr. MICHAEL GARCIA Title: Black Hole X-ray Novae in M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660792 41.267684 472.285706 23.909260 19.753256 10.696591 41.274524 448.571442 23.310961 19.242939 10.794277 41.247542 340.954559 20.224077 16.858845 10.702212 41.255860 329.142853 19.635223 16.762878 10.718853 41.315119 303.113647 19.318298 15.690494 10.564436 41.020551 407.386353 26.136869 15.586655 10.728933 41.267536 275.285706 18.434765 14.932966 10.629787 41.272661 243.285721 18.184818 13.378508 10.554869 41.310073 222.034088 16.887070 13.148171 10.674187 41.276622 195.857147 15.743836 12.440243