Summary Page Created:Tue June 6, 2006 21:02 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 4731 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf04731N002 full img2.fits acisf04731N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 21:02 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 4731 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T23:38:59 Date and time of file creation DATE-OBS 2004-01-19T05:57:06 Observation start date DATE-END 2004-01-19T22:32:45 Observation end date RA PNT 210.82073424983 Pointing RA DEC PNT 54.393392954872 Pointing Dec ROLL PNT 79.742820998294 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T01:00:49 Date and time of file creation DATE-OBS 2004-01-19T05:57:06 Observation start date DATE-END 2004-01-19T22:32:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 4731 Observation id SEQ NUM 600386 Sequence number RA NOM 210.82073424983 Nominal RA DEC NOM 54.393392954872 Nominal Dec ROLL NOM 79.742820998294 Nominal Roll

Summary Page Created:Tue June 6, 2006 21:02 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 4731 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766451 54.459658 2657.142822 59.597523 44.584785 211.058677 54.434224 1104.306763 37.448574 29.488623 210.850753 54.330146 517.056824 25.887455 19.973259 211.013174 54.681325 1663.980103 84.884033 19.602980 210.810281 54.701084 1443.877075 78.613968 18.366674 210.839738 54.329308 423.375000 24.084438 17.578779 210.720253 54.353094 359.571442 23.795101 15.111153 211.069120 54.270387 362.791656 27.485140 13.199557 211.090623 54.322528 320.724152 24.363586 13.164078 210.816234 54.296646 230.693176 19.624624 11.755292