Summary Page Created:Sat April 29, 2006 15:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 4734 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf04734N002 full img2.fits acisf04734N002 cntr img2.fits

Summary Page Created:Sat April 29, 2006 15:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 4734 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T16:24:43 Date and time of file creation DATE-OBS 2004-07-11T01:43:18 Observation start date DATE-END 2004-07-11T12:15:42 Observation end date RA PNT 210.76931167663 Pointing RA DEC PNT 54.307723278104 Pointing Dec ROLL PNT 246.18460657417 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T19:21:44 Date and time of file creation DATE-OBS 2004-07-11T01:43:18 Observation start date DATE-END 2004-07-11T12:15:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 4734 Observation id SEQ NUM 600389 Sequence number RA NOM 210.76931167663 Nominal RA DEC NOM 54.307723278104 Nominal Dec ROLL NOM 246.18460657417 Nominal Roll

Summary Page Created:Sat April 29, 2006 15:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 4734 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.617823 54.274011 527.102295 25.640690 20.557259 210.766465 54.459558 586.467529 29.698208 19.747572 210.468998 54.052501 1113.352173 69.815506 15.947062 210.839751 54.329346 261.142853 19.062099 13.699586 210.656595 54.006587 897.215942 66.247643 13.543365 210.850710 54.330190 220.511368 17.197781 12.822083 210.720123 54.353184 210.954544 16.471174 12.807498 210.884813 54.350819 246.857147 19.961119 12.366899 210.900114 54.323526 244.000000 20.132359 12.119793 210.333397 54.311000 355.703461 30.466202 11.675346