Summary Page Created:Tue June 27, 2006 21:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600402

Instrument: ACIS Obs ID: 4747 Source: NGC 1313 X-1 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04747N002 full img2.fits acisf04747N002 cntr img2.fits

Summary Page Created:Tue June 27, 2006 21:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600402

Instrument: ACIS Obs ID: 4747 Source: NGC 1313 X-1 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-28T01:35:51 Date and time of file creation DATE-OBS 2003-11-17T06:02:11 Observation start date DATE-END 2003-11-17T07:52:07 Observation end date RA PNT 49.607267285832 Pointing RA DEC PNT -66.488422386395 Pointing Dec ROLL PNT 357.86332994009 Pointing Roll RA TARG 49.583333 Observer’s specified target RA DEC TARG -66.486389 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-28T01:49:51 Date and time of file creation DATE-OBS 2003-11-17T06:02:11 Observation start date DATE-END 2003-11-17T07:52:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT NGC 1313 X-1 Obs 1 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4747 Observation id SEQ NUM 600402 Sequence number RA NOM 49.607267285832 Nominal RA DEC NOM -66.488422386395 Nominal Dec ROLL NOM 357.86332994009 Nominal Roll

Summary Page Created:Tue June 27, 2006 21:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600402

Instrument: ACIS Obs ID: 4747 Source: NGC 1313 X-1 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 49.583251 -66.486402 1596.285767 42.708488 37.376312 49.575754 -66.501133 95.000000 11.048820 8.598203 49.522718 -66.504150 48.000000 8.334884 5.758929 49.578576 -66.500339 48.142857 9.084611 5.299386 50.373633 -66.524589 108.830566 20.908957 5.204973 50.374760 -66.473372 106.850502 22.993170 4.647054 50.330752 -66.522001 101.141075 25.832119 3.915322 49.756325 -66.492383 26.159090 6.816224 3.837769 49.392039 -66.644823 30.636364 8.091525 3.786229 50.104232 -66.526013 42.217857 12.695331 3.325463