Summary Page Created:Mon May 29, 2006 06:49 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600404

Instrument: ACIS Obs ID: 4749 Source: NGC 1313 X-2 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04749N002 full img2.fits acisf04749N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 06:49 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600404

Instrument: ACIS Obs ID: 4749 Source: NGC 1313 X-2 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T10:18:31 Date and time of file creation DATE-OBS 2004-03-10T04:51:52 Observation start date DATE-END 2004-03-10T06:42:28 Observation end date RA PNT 49.578158952017 Pointing RA DEC PNT -66.608810562324 Pointing Dec ROLL PNT 242.56466277558 Pointing Roll RA TARG 49.592917 Observer’s specified target RA DEC TARG -66.601028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T10:48:06 Date and time of file creation DATE-OBS 2004-03-10T04:51:52 Observation start date DATE-END 2004-03-10T06:42:28 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT NGC 1313 X-2 Obs 1 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4749 Observation id SEQ NUM 600404 Sequence number RA NOM 49.578158952017 Nominal RA DEC NOM -66.608810562324 Nominal Dec ROLL NOM 242.56466277558 Nominal Roll

Summary Page Created:Mon May 29, 2006 06:49 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600404

Instrument: ACIS Obs ID: 4749 Source: NGC 1313 X-2 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 49.592789 -66.600964 769.142883 29.898996 25.724705 49.278272 -66.889432 285.561462 34.017036 8.394661 49.165087 -66.868794 173.292358 29.396233 5.895053 49.093087 -66.560498 49.691963 11.310445 4.393458 49.196436 -66.872479 135.427673 32.982674 4.106025 49.180694 -66.854874 126.984825 32.357330 3.924453 49.337571 -66.853700 91.272728 25.597931 3.565629 49.267673 -66.776493 56.158928 15.778756 3.559148 49.239618 -66.800222 68.568626 19.753296 3.471250 49.383813 -66.768639 44.693180 13.612221 3.283313