Summary Page Created:Fri June 2, 2006 14:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600405

Instrument: ACIS Obs ID: 4750 Source: NGC 1313 X-2 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04750N003 full img2.fits acisf04750N003 cntr img2.fits

Summary Page Created:Fri June 2, 2006 14:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600405

Instrument: ACIS Obs ID: 4750 Source: NGC 1313 X-2 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-02T17:31:09 Date and time of file creation DATE-OBS 2004-02-22T04:25:33 Observation start date DATE-END 2004-02-22T06:08:38 Observation end date RA PNT 49.584664089913 Pointing RA DEC PNT -66.610173504407 Pointing Dec ROLL PNT 260.32283551791 Pointing Roll RA TARG 49.592917 Observer’s specified target RA DEC TARG -66.601028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-02T18:00:49 Date and time of file creation DATE-OBS 2004-02-22T04:25:33 Observation start date DATE-END 2004-02-22T06:08:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT NGC 1313 X-2 Obs 2 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4750 Observation id SEQ NUM 600405 Sequence number RA NOM 49.584664089913 Nominal RA DEC NOM -66.610173504407 Nominal Dec ROLL NOM 260.32283551791 Nominal Roll

Summary Page Created:Fri June 2, 2006 14:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600405

Instrument: ACIS Obs ID: 4750 Source: NGC 1313 X-2 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 49.583601 -66.486356 1544.897705 43.496731 35.517559 49.592817 -66.601014 1062.571411 35.027935 30.334970 49.577106 -66.500900 95.257500 13.046343 7.301471 49.515441 -66.915919 135.691025 23.085003 5.877887 49.387140 -66.904850 107.926788 22.617203 4.771889 49.387258 -66.908697 80.142860 20.695150 3.872543 49.411600 -66.832493 62.176472 16.079718 3.866764 49.555017 -66.847545 65.725487 17.065926 3.851270 49.543473 -66.875104 64.090912 19.636017 3.263947 49.418104 -66.909544 77.717606 24.405365 3.184448