Summary Page Created:Thu June 22, 2006 09:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600409

Instrument: ACIS Obs ID: 4754 Source: M74 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04754N002 full img2.fits acisf04754N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 09:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600409

Instrument: ACIS Obs ID: 4754 Source: M74 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T13:43:28 Date and time of file creation DATE-OBS 2003-12-29T13:07:58 Observation start date DATE-END 2003-12-29T15:18:29 Observation end date RA PNT 24.214636338192 Pointing RA DEC PNT 15.753626915173 Pointing Dec ROLL PNT 289.5513325239 Pointing Roll RA TARG 24.212917 Observer’s specified target RA DEC TARG 15.763056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T13:56:28 Date and time of file creation DATE-OBS 2003-12-29T13:07:58 Observation start date DATE-END 2003-12-29T15:18:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M74 X-1 Obs 2 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4754 Observation id SEQ NUM 600409 Sequence number RA NOM 24.214636338192 Nominal RA DEC NOM 15.753626915173 Nominal Dec ROLL NOM 289.5513325239 Nominal Roll

Summary Page Created:Thu June 22, 2006 09:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600409

Instrument: ACIS Obs ID: 4754 Source: M74 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 24.295175 15.460054 117.926788 22.850128 5.160881 24.344806 15.477572 119.231247 23.366421 5.102675 24.266450 15.528084 77.372551 16.890991 4.580699 24.289998 15.471603 97.615181 25.000149 3.904584 24.283455 15.485453 85.333336 23.305159 3.661564 24.335966 15.512262 65.579544 18.734701 3.500432 24.326031 15.539433 52.098038 15.603579 3.338852 24.252006 15.560078 37.625000 11.879489 3.167224 23.943636 15.743590 29.511364 9.363805 3.151642 24.267622 15.520874 49.176472 15.634418 3.145398