Summary Page Created:Tue January 13, 2009 23:26 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5296 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf05296N003 full img2.fits acisf05296N003 cntr img2.fits

Summary Page Created:Tue January 13, 2009 23:26 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5296 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 ASCDS version number DATE 2009-01-14T03:25:39 Date and time of file creation DATE-OBS 2004-01-21T10:39:53 Observation start date DATE-END 2004-01-21T11:52:37 Observation end date RA PNT 210.82058182182 Pointing RA DEC PNT 54.393460501993 Pointing Dec ROLL PNT 79.742971590708 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 ASCDS version number DATE 2009-01-14T04:24:22 Date and time of file creation DATE-OBS 2004-01-21T10:39:53 Observation start date DATE-END 2004-01-21T11:52:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 5296 Observation id SEQ NUM 600386 Sequence number RA NOM 210.82058182182 Nominal RA DEC NOM 54.393460501993 Nominal Dec ROLL NOM 79.742971590708 Nominal Roll

Summary Page Created:Tue January 13, 2009 23:26 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5296 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766428 54.459682 141.857147 15.474582 9.167107 211.058661 54.434292 71.477272 10.361160 6.898578 210.704492 54.233668 65.193100 12.410978 5.252858 210.802159 54.688457 92.072319 18.885717 4.875236 210.675523 54.210343 57.830357 12.164984 4.753838 210.657146 54.213623 62.190178 13.454855 4.622137 210.850940 54.330160 35.714287 7.743237 4.612320 210.808704 54.700901 93.990036 21.162930 4.441258 210.710241 54.209604 52.833332 12.077264 4.374611 210.821494 54.196502 52.750000 12.273830 4.297762