Summary Page Created:Tue June 6, 2006 23:30 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5297 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf05297N002 full img2.fits acisf05297N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 23:30 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5297 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T02:30:20 Date and time of file creation DATE-OBS 2004-01-24T01:34:02 Observation start date DATE-END 2004-01-24T08:11:04 Observation end date RA PNT 210.82073211623 Pointing RA DEC PNT 54.393405802681 Pointing Dec ROLL PNT 79.742825885697 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T03:29:42 Date and time of file creation DATE-OBS 2004-01-24T01:34:02 Observation start date DATE-END 2004-01-24T08:11:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 5297 Observation id SEQ NUM 600386 Sequence number RA NOM 210.82073211623 Nominal RA DEC NOM 54.393405802681 Nominal Dec ROLL NOM 79.742825885697 Nominal Roll

Summary Page Created:Tue June 6, 2006 23:30 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600386

Instrument: ACIS Obs ID: 5297 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766466 54.459672 748.571411 33.239517 22.520525 211.058728 54.434202 442.897736 24.267559 18.250610 210.809689 54.301754 323.958344 22.042973 14.696672 211.012625 54.681286 706.720947 54.855686 12.883276 210.850753 54.330186 198.590912 16.565289 11.988376 210.810454 54.700921 633.269104 54.567272 11.605291 210.839694 54.329374 154.193176 14.718924 10.475846 210.900081 54.323577 140.791672 15.625725 9.010248 210.922348 54.693259 465.315613 54.905361 8.474867 210.720270 54.353085 119.285713 14.896629 8.007564