Summary Page Created:Sat April 29, 2006 06:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5339 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf05339N002 full img2.fits acisf05339N002 cntr img2.fits

Summary Page Created:Sat April 29, 2006 06:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5339 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T10:20:33 Date and time of file creation DATE-OBS 2004-07-07T13:24:01 Observation start date DATE-END 2004-07-07T17:44:37 Observation end date RA PNT 210.76922890215 Pointing RA DEC PNT 54.307692068407 Pointing Dec ROLL PNT 246.18468109534 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T10:50:01 Date and time of file creation DATE-OBS 2004-07-07T13:24:01 Observation start date DATE-END 2004-07-07T17:44:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 5339 Observation id SEQ NUM 600389 Sequence number RA NOM 210.76922890215 Nominal RA DEC NOM 54.307692068407 Nominal Dec ROLL NOM 246.18468109534 Nominal Roll

Summary Page Created:Sat April 29, 2006 06:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5339 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.884795 54.350817 305.714294 21.229588 14.400388 210.617712 54.273976 206.272720 16.568220 12.449903 210.850697 54.330200 147.636368 13.963626 10.572925 210.468975 54.051981 452.588043 46.361950 9.762058 210.766288 54.459588 159.207504 17.091650 9.314928 210.656956 54.006767 344.657806 44.787891 7.695334 210.473312 54.066813 337.893738 44.474628 7.597449 210.720323 54.353072 77.397728 10.570026 7.322378 210.839791 54.329297 95.285713 13.100719 7.273319 210.816055 54.296701 60.142857 9.802948 6.135180