Summary Page Created:Sat April 29, 2006 14:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5340 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf05340N002 full img2.fits acisf05340N002 cntr img2.fits

Summary Page Created:Sat April 29, 2006 14:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5340 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T16:07:41 Date and time of file creation DATE-OBS 2004-07-08T11:07:27 Observation start date DATE-END 2004-07-09T03:07:59 Observation end date RA PNT 210.76929703991 Pointing RA DEC PNT 54.307719094808 Pointing Dec ROLL PNT 246.1846193391 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-29T18:10:43 Date and time of file creation DATE-OBS 2004-07-08T11:07:27 Observation start date DATE-END 2004-07-09T03:07:59 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 5340 Observation id SEQ NUM 600389 Sequence number RA NOM 210.76929703991 Nominal RA DEC NOM 54.307719094808 Nominal Dec ROLL NOM 246.1846193391 Nominal Roll

Summary Page Created:Sat April 29, 2006 14:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600389

Instrument: ACIS Obs ID: 5340 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766362 54.459664 931.187500 36.297253 25.654491 210.617798 54.274005 807.284119 32.010174 25.219608 210.850705 54.330193 527.863647 25.542276 20.666271 210.469103 54.052440 1785.518311 87.577980 20.387754 210.656744 54.006968 1697.913574 83.330017 20.375774 210.884849 54.350774 552.857117 28.457418 19.427523 210.839740 54.329345 400.571442 24.216234 16.541441 210.720125 54.353194 324.988647 20.453894 15.888839 210.333362 54.311298 515.793091 37.699650 13.681643 210.816042 54.296745 217.571426 16.577675 13.124364