Summary Page Created:Wed April 19, 2006 11:46 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6115 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf06115N002 full img2.fits acisf06115N002 cntr img2.fits

Summary Page Created:Wed April 19, 2006 11:46 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6115 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-19T14:15:44 Date and time of file creation DATE-OBS 2004-09-08T18:16:36 Observation start date DATE-END 2004-09-09T04:49:09 Observation end date RA PNT 210.84969508376 Pointing RA DEC PNT 54.311748304741 Pointing Dec ROLL PNT 308.11930218092 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-19T15:44:25 Date and time of file creation DATE-OBS 2004-09-08T18:16:36 Observation start date DATE-END 2004-09-09T04:49:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 6115 Observation id SEQ NUM 600390 Sequence number RA NOM 210.84969508376 Nominal RA DEC NOM 54.311748304741 Nominal Dec ROLL NOM 308.11930218092 Nominal Roll

Summary Page Created:Wed April 19, 2006 11:46 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6115 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766752 54.459653 1483.935059 45.104279 32.900097 210.617594 54.274156 622.840881 29.101480 21.402380 210.850709 54.330181 302.714294 19.392601 15.609783 210.839748 54.329381 304.857147 19.721117 15.458411 210.974048 54.160745 398.820679 26.550587 15.021162 211.249329 54.108449 911.106323 65.242126 13.965000 210.899990 54.323565 229.285721 17.058401 13.441219 211.084957 54.036843 939.448486 73.965477 12.701176 210.593239 54.299903 213.340912 18.267235 11.678884 210.816007 54.296742 136.857147 13.577785 10.079490