Summary Page Created:Mon April 17, 2006 10:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6118 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf06118N002 full img2.fits acisf06118N002 cntr img2.fits

Summary Page Created:Mon April 17, 2006 10:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6118 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-17T13:44:16 Date and time of file creation DATE-OBS 2004-09-11T15:15:08 Observation start date DATE-END 2004-09-11T18:48:46 Observation end date RA PNT 210.84972011795 Pointing RA DEC PNT 54.311803995552 Pointing Dec ROLL PNT 308.11927622998 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-17T14:12:12 Date and time of file creation DATE-OBS 2004-09-11T15:15:08 Observation start date DATE-END 2004-09-11T18:48:46 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 6118 Observation id SEQ NUM 600390 Sequence number RA NOM 210.84972011795 Nominal RA DEC NOM 54.311803995552 Nominal Dec ROLL NOM 308.11927622998 Nominal Roll

Summary Page Created:Mon April 17, 2006 10:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6118 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766692 54.459547 334.977509 22.562534 14.846626 210.617428 54.274149 204.465912 17.396053 11.753581 210.900024 54.323516 99.428574 11.649236 8.535201 210.974021 54.160740 133.241379 15.613119 8.533937 211.249794 54.108232 316.857147 38.545689 8.220301 211.084513 54.037203 332.986725 41.732304 7.979112 210.593330 54.299816 90.954544 11.904752 7.640188 210.839696 54.329343 82.428574 10.814426 7.622094 210.850680 54.330141 73.142860 10.518532 6.953713 211.206533 54.088784 283.511627 44.470364 6.375294