Summary Page Created:Tue May 23, 2006 12:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700921

Instrument: ACIS Obs ID: 4839 Source: LBQS 2116-4439 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04839N002 full img2.fits acisf04839N002 cntr img2.fits

Summary Page Created:Tue May 23, 2006 12:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700921

Instrument: ACIS Obs ID: 4839 Source: LBQS 2116-4439 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T15:26:14 Date and time of file creation DATE-OBS 2004-06-21T19:33:38 Observation start date DATE-END 2004-06-21T21:33:33 Observation end date RA PNT 320.05317416999 Pointing RA DEC PNT -44.439241488166 Pointing Dec ROLL PNT 79.144222891243 Pointing Roll RA TARG 320.048333 Observer’s specified target RA DEC TARG -44.448333 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T16:04:00 Date and time of file creation DATE-OBS 2004-06-21T19:33:38 Observation start date DATE-END 2004-06-21T21:33:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 2116-4439 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4839 Observation id SEQ NUM 700921 Sequence number RA NOM 320.05317416999 Nominal RA DEC NOM -44.439241488166 Nominal Dec ROLL NOM 79.144222891243 Nominal Roll

Summary Page Created:Tue May 23, 2006 12:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700921

Instrument: ACIS Obs ID: 4839 Source: LBQS 2116-4439 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 320.272754 -44.450635 121.487503 12.860378 9.446651 320.215673 -44.151067 181.196014 27.978218 6.476324 320.324440 -44.586813 85.291664 14.589466 5.846113 320.211568 -44.168091 155.216965 29.590118 5.245568 320.128232 -44.138808 121.864288 25.861786 4.712137 320.033032 -44.178703 98.443184 21.316998 4.618060 320.045173 -44.144523 127.303574 27.924784 4.558802 320.171790 -44.145127 125.368774 28.488171 4.400731 320.071051 -44.132587 128.770767 29.920033 4.303831 320.039237 -44.160482 101.666664 24.426765 4.162101