Summary Page Created:Fri May 26, 2006 23:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700922

Instrument: ACIS Obs ID: 4840 Source: LBQS 2140-4552 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04840N002 full img2.fits acisf04840N002 cntr img2.fits

Summary Page Created:Fri May 26, 2006 23:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700922

Instrument: ACIS Obs ID: 4840 Source: LBQS 2140-4552 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-27T02:52:59 Date and time of file creation DATE-OBS 2004-03-25T02:20:50 Observation start date DATE-END 2004-03-25T04:25:45 Observation end date RA PNT 325.86412357847 Pointing RA DEC PNT -45.639649788222 Pointing Dec ROLL PNT 133.26337291961 Pointing Roll RA TARG 325.87171 Observer’s specified target RA DEC TARG -45.647721 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-27T03:26:40 Date and time of file creation DATE-OBS 2004-03-25T02:20:50 Observation start date DATE-END 2004-03-25T04:25:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 2140-4552 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4840 Observation id SEQ NUM 700922 Sequence number RA NOM 325.86412357847 Nominal RA DEC NOM -45.639649788222 Nominal Dec ROLL NOM 133.26337291961 Nominal Roll

Summary Page Created:Fri May 26, 2006 23:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700922

Instrument: ACIS Obs ID: 4840 Source: LBQS 2140-4552 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 326.054525 -45.516242 74.272728 11.474784 6.472691 325.630877 -45.378246 143.598007 28.698717 5.003639 325.503417 -45.461426 113.774086 23.203703 4.903273 326.034628 -45.712894 37.556820 8.441542 4.449048 325.547313 -45.434386 117.331253 27.773222 4.224618 325.541777 -45.489953 87.590912 22.222651 3.941515 325.639892 -45.381573 101.331253 27.469156 3.688910 325.983869 -45.694658 31.113636 8.887115 3.500983 325.773323 -45.632553 22.159090 6.456545 3.432035 325.528789 -45.443048 92.667770 27.149261 3.413270