Summary Page Created:Wed April 26, 2006 08:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 701004

Instrument: ACIS Obs ID: 4923 Source: M87 PI: Dr. John Biretta Title: HST/Chandra Monitoring of a Dramatic Flare in the M87 Jet

acisf04923N002 full img2.fits acisf04923N002 cntr img2.fits

Summary Page Created:Wed April 26, 2006 08:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 701004

Instrument: ACIS Obs ID: 4923 Source: M87 PI: Dr. John Biretta Title: HST/Chandra Monitoring of a Dramatic Flare in the M87 Jet

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T12:09:28 Date and time of file creation DATE-OBS 2004-08-05T08:11:51 Observation start date DATE-END 2004-08-05T09:54:22 Observation end date RA PNT 187.70080149901 Pointing RA DEC PNT 12.379649618647 Pointing Dec ROLL PNT 262.15732347716 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T12:42:04 Date and time of file creation DATE-OBS 2004-08-05T08:11:51 Observation start date DATE-END 2004-08-05T09:54:22 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE HST/Chandra Monitoring of a Dramatic Flare in the M87 Jet

Proposal

OBSERVER Dr. John Biretta Principal investigator OBS ID 4923 Observation id SEQ NUM 701004 Sequence number RA NOM 187.70080149901 Nominal RA DEC NOM 12.379649618647 Nominal Dec ROLL NOM 262.15732347716 Nominal Roll

Summary Page Created:Wed April 26, 2006 08:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 701004

Instrument: ACIS Obs ID: 4923 Source: M87 PI: Dr. John Biretta Title: HST/Chandra Monitoring of a Dramatic Flare in the M87 Jet

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705782 12.391226 7688.143066 99.099350 77.580154 187.702592 12.392389 1009.857117 39.327084 25.678413 187.700859 12.393052 89.857140 17.311642 5.190562 187.704496 12.391639 107.285713 26.104692 4.109825 187.703889 12.391733 88.428574 22.230965 3.977721 187.711585 12.417174 34.000000 9.035868 3.762782 187.704930 12.434422 31.113636 8.887115 3.500983