Summary Page Created:Fri February 17, 2006 01:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800431

Instrument: ACIS Obs ID: 4988 Source: HCG 97 PI: DR. JAN VRTILEK Title: X-Ray Bright Hickson Compact Groups: the Origin and Distribution of Metallicity and the Regulation of

Cooling Flows

acisf04988N002 full img2.fits acisf04988N002 cntr img2.fits

Summary Page Created:Fri February 17, 2006 01:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800431

Instrument: ACIS Obs ID: 4988 Source: HCG 97 PI: DR. JAN VRTILEK Title: X-Ray Bright Hickson Compact Groups: the Origin and Distribution of Metallicity and the Regulation of

Cooling Flows

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-17T05:03:05 Date and time of file creation DATE-OBS 2005-01-14T20:38:40 Observation start date DATE-END 2005-01-15T13:24:18 Observation end date RA PNT 356.85561259174 Pointing RA DEC PNT -2.3293046121611 Pointing Dec ROLL PNT 293.10873603119 Pointing Roll RA TARG 356.845833 Observer’s specified target RA DEC TARG -2.301944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-17T06:11:31 Date and time of file creation DATE-OBS 2005-01-14T20:38:40 Observation start date DATE-END 2005-01-15T13:24:18 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HCG 97 Source name TITLE X-Ray Bright Hickson Compact Groups: the Origin and Distribution of Metallicity and the Regulation of Cooling Flows

Proposal title

OBSERVER DR. JAN VRTILEK Principal investigator OBS ID 4988 Observation id SEQ NUM 800431 Sequence number RA NOM 356.85561259174 Nominal RA DEC NOM -2.3293046121611 Nominal Dec ROLL NOM 293.10873603119 Nominal Roll

Summary Page Created:Fri February 17, 2006 01:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800431

Instrument: ACIS Obs ID: 4988 Source: HCG 97 PI: DR. JAN VRTILEK Title: X-Ray Bright Hickson Compact Groups: the Origin and Distribution of Metallicity and the Regulation of

Cooling Flows

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 356.799372 -2.337082 520.306824 25.116785 20.715502 356.846134 -2.167917 551.622498 29.840391 18.485767 357.030935 -2.585082 1223.086426 71.925140 17.004990 356.817098 -2.254537 389.666656 23.898293 16.305208 356.920669 -2.634706 1103.986694 72.759254 15.173145 356.833645 -2.350088 186.714279 15.898796 11.743926 357.018929 -2.553937 848.500000 75.737625 11.203150 356.700282 -2.271973 208.977493 19.392384 10.776267 356.973249 -2.610260 716.521606 83.313950 8.600260 357.023431 -2.569538 683.655334 80.597954 8.482292