Summary Page Created:Wed June 28, 2006 01:19 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800419

Instrument: ACIS Obs ID: 5250 Source: MS2137.3-2353 PI: Dr Steven Allen Title: A detailed Chandra study of the luminous lensing cluster MS2137.3-2353

acisf05250N002 full img2.fits acisf05250N002 cntr img2.fits

Summary Page Created:Wed June 28, 2006 01:19 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800419

Instrument: ACIS Obs ID: 5250 Source: MS2137.3-2353 PI: Dr Steven Allen Title: A detailed Chandra study of the luminous lensing cluster MS2137.3-2353

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-28T04:53:59 Date and time of file creation DATE-OBS 2003-11-18T20:07:47 Observation start date DATE-END 2003-11-19T07:51:47 Observation end date RA PNT 325.06909515791 Pointing RA DEC PNT -23.681547985172 Pointing Dec ROLL PNT 288.42631954482 Pointing Roll RA TARG 325.06375 Observer’s specified target RA DEC TARG -23.661389 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-28T05:18:11 Date and time of file creation DATE-OBS 2003-11-18T20:07:47 Observation start date DATE-END 2003-11-19T07:51:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT MS2137.3-2353 Source name TITLE A detailed Chandra study of the luminous lensing cluster MS2137.3- 2353

Proposal title

OBSERVER Dr Steven Allen Principal investigator OBS ID 5250 Observation id SEQ NUM 800419 Sequence number RA NOM 325.06909515791 Nominal RA DEC NOM -23.681547985172 Nominal Dec ROLL NOM 288.42631954482 Nominal Roll

Summary Page Created:Wed June 28, 2006 01:19 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800419

Instrument: ACIS Obs ID: 5250 Source: MS2137.3-2353 PI: Dr Steven Allen Title: A detailed Chandra study of the luminous lensing cluster MS2137.3-2353

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 325.172790 -23.788405 1445.125000 42.916031 33.673313 325.112080 -23.988876 718.684387 56.593910 12.698970 325.233704 -23.949982 708.807312 58.303734 12.157151 324.844854 -23.820626 234.333328 24.319048 9.635795 325.076352 -23.682175 128.285721 13.510693 9.495125 325.183212 -23.968290 436.916931 57.165543 7.643013 325.232921 -23.939791 407.919647 56.498356 7.220026 325.113332 -23.714560 71.159088 9.895083 7.191359 325.059979 -23.705723 81.285713 11.449807 7.099309 325.063143 -23.661064 335.285706 48.143047 6.964365