Summary Page Created:Sat November 24, 2007 15:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200370

Instrument: HRC Obs ID: 6373 Source: Alpha Centauri PI: Dr. Thomas Ayres Title: HRC Imaging of the ‘Fainted’ Primary of the Alpha Centauri System

hrcf06373N003 full img2.fits hrcf06373N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 15:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200370

Instrument: HRC Obs ID: 6373 Source: Alpha Centauri PI: Dr. Thomas Ayres Title: HRC Imaging of the ‘Fainted’ Primary of the Alpha Centauri System

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T20:01:54 Date and time of file creation DATE-OBS 2005-10-21T02:45:00 Observation start date DATE-END 2005-10-21T04:33:23 Observation end date RA PNT 219.87781273879 Pointing RA DEC PNT -60.834533903138 Pointing Dec ROLL PNT 197.89230147051 Pointing Roll RA TARG 219.885833 Observer’s specified target RA DEC TARG -60.834889 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T20:14:05 Date and time of file creation DATE-OBS 2005-10-21T02:45:00 Observation start date DATE-END 2005-10-21T04:33:23 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Alpha Centauri Source name TITLE HRC Imaging of the ‘Fainted’ Primary of the Alpha Centauri System OBSERVER Dr. Thomas Ayres Principal investigator OBS ID 6373 Observation id SEQ NUM 200370 Sequence number RA NOM 219.87781273879 Nominal RA DEC NOM -60.834533903138 Nominal Dec ROLL NOM 197.89230147051 Nominal Roll

Summary Page Created:Sat November 24, 2007 15:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200370

Instrument: HRC Obs ID: 6373 Source: Alpha Centauri PI: Dr. Thomas Ayres Title: HRC Imaging of the ‘Fainted’ Primary of the Alpha Centauri System

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 219.884762 -60.835097 10030.458008 105.480331 95.093163 219.889147 -60.833393 2006.583374 47.915123 41.877872 220.498034 -60.787286 113.508034 23.671711 4.795092 220.167465 -61.110667 83.788391 21.810093 3.841726 220.053364 -61.143121 93.724251 25.366093 3.694864 219.647438 -60.522405 102.586433 28.221113 3.635095 219.592506 -60.570447 82.646431 23.192554 3.563490 219.615797 -60.557066 89.974998 25.364443 3.547289 220.464613 -60.694253 83.481728 24.039841 3.472641 219.877182 -60.548555 75.416664 21.759251 3.465959