Summary Page Created:Wed March 8, 2006 18:12 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400398

Instrument: ACIS Obs ID: 5468 Source: KS 1731-260 PI: Dr. Rudy Wijnands Title: Cooling curves of accretion-heated neutron stars

acisf05468N003 full img2.fits acisf05468N003 cntr img2.fits

Summary Page Created:Wed March 8, 2006 18:12 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400398

Instrument: ACIS Obs ID: 5468 Source: KS 1731-260 PI: Dr. Rudy Wijnands Title: Cooling curves of accretion-heated neutron stars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-08T21:32:49 Date and time of file creation DATE-OBS 2005-06-04T03:29:30 Observation start date DATE-END 2005-06-04T15:01:38 Observation end date RA PNT 263.5593148412 Pointing RA DEC PNT -26.079291419718 Pointing Dec ROLL PNT 83.467977630834 Pointing Roll RA TARG 263.55625 Observer’s specified target RA DEC TARG -26.088556 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-08T23:10:00 Date and time of file creation DATE-OBS 2005-06-04T03:29:30 Observation start date DATE-END 2005-06-04T15:01:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT KS 1731-260 Source name TITLE Cooling curves of accretion-heated neutron stars

Proposal title

OBSERVER Dr. Rudy Wijnands Principal investigator OBS ID 5468 Observation id SEQ NUM 400398 Sequence number RA NOM 263.5593148412 Nominal RA DEC NOM -26.079291419718 Nominal Dec ROLL NOM 83.467977630834 Nominal Roll

Summary Page Created:Wed March 8, 2006 18:12 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400398

Instrument: ACIS Obs ID: 5468 Source: KS 1731-260 PI: Dr. Rudy Wijnands Title: Cooling curves of accretion-heated neutron stars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 263.530466 -25.771787 1266.152832 69.473228 18.225046 263.661212 -25.784594 1374.524902 76.885246 17.877617 263.577225 -25.966391 439.132507 25.761559 17.046038 263.523928 -25.806021 766.208313 64.869255 11.811580 263.526949 -25.784737 784.450867 67.873444 11.557552 263.515835 -26.216913 206.375000 18.750782 11.006208 263.552935 -26.096755 152.857147 14.200699 10.764058 263.664419 -25.796200 739.215149 69.476364 10.639808 263.619208 -25.779022 652.128601 69.302177 9.409929 263.559281 -25.772761 616.345520 70.889610 8.694441